Contents

Properties	Methods

About Net Vbx Evaluation Version !

How Register ?

How use Net Vbx ?


Logon

Test this property to know if a user is loged on.

When you change this property:

TRUE 	you log a user (dialog box displayed)

FALSE	you log off a use (dialog box displayed)

comments:

After change value (TRUE/FALSE) test again the value to know if operation was executed successfuly.

i.e:

NetVbx1.Logon=TRUE

if (NetVbx1.Logon=TRUE)

'User successfuly log on

else

'User not log on


Action

Use this property to display WFW Dialog Box:

Possibles Values:

Values	Actions

0	(none)

1	Display "Share As.." Dialog Box (Allows user to create a shared disk)

2	Display "Share As.." Dialog Box (Allows user to create a shared printer)

3	Display "Stop Share.." Dialog Box (Allows user to stop a shared disk)

4	Display "Stop Share.." Dialog Box (Allows user to stop a shared printer)

5	Display "Connect disk.." Dialog Box (Allows user to connect a network drive)

6	Display "Connect printer.." Dialog Box (Allows user to connect a network printer)

7	Display "Password.." Dialog Box (Allows user to change password)


Visible

Must be allways TRUE in evaluation version. See How register ?


Propeties

Action	ComputerName	LanName

Logon	UserName	Visible


How Register

Price NetVbx and printed documentation : no fixed in this beta version

Call or Send your Fax At

EZOS s.a.

Windows  and Windows NT programming education and system developement.

Dll, Virtual Device Drivers, NT Drivers, VBX, ODBC Driver,...

Adrress:

Grand Place, 6

B1420 Braine-L'Alleud

Belgium

Contact: Jean-Claude Streel

Fax: +32 2 387 20 10

Voice: +32 2 387 20 00


About Net Vbx Evaluation Version !

With evaluation version, visible property must be TRUE, and you cannot change size of the control.

At run time and design time, a Copyright message is allways displayed.

How Register ?


How Use Net Vbx

This vbx was designed to allow Visual Basic programmers adds Windows for Workgroup functions in her applications, and provides networks facilities to users.

With Net Vbx custom control, you are able to use Windows for Workgroup DLLs like COMMDLG.DLL.

Use properties to know network informations like "Current user Logged", or to do some actions like connect a network drive.

Use Methods to do network operation without dialog box.

ie:

NetVbx1.Logon=TRUE  display logon Dialog Box.

or

NetVbx1.Logon=FALSE  logon off the current user.


ComputerName

Read Only

Contains the name of the local machine.


LanName

Read Only

Contains the name of the Lan or the Workgroup.


UserName

Read Only

Contains the name of the current User or an empty string if no user logged.


Methods

No available at this time.